<!--
 * @Author: 王文杰
 * @Date: 2024-01-04 12:54:56
 * @LastEditors: 王文杰 
 * @LastEditTime: 2024-03-26 14:34:58
 * @FilePath: /app-nx-personal/src/App.vue
 * @Description: 这是默认设置,请设置`customMade`, 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
-->
<script setup lang="ts">
import { onLaunch, onShow, onHide } from '@dcloudio/uni-app'
import { updateManager } from '@/utils/index'
onLaunch(() => {
  console.log('App Launch')
  updateManager()
})
onShow(() => {
  console.log('App Show')
})
onHide(() => {
  console.log('App Hide')
})
</script>

<style lang="scss">
// 字体图标
@import '@/styles/fonts.scss';
@import '@/styles/base.scss';
</style>
